Ventura Publisher 1.1 - 2.0 Driver Installation Instructions
See the SpeedSTAR-24 Manual for detailed installation information.
_______________________________________________________________________

The Ventura driver files for the SpeedSTAR-24 have been copied to the 
specified directory.  Follow the instructions below to load the drivers.


[1] ... Install Ventura selecting IBM Personal System/2 (640x480) as 
    the video display for version 1.1 and IBM VGA or Compatible 
    (640x480) as the video display for version 2.0.

[2] ... Verify Ventura operates completely in this mode.

[3] ... Use a DOS file editor (EDLIN or EDIT for example) to browse 
    the VP.BAT or VPPROF.BAT file residing in the root directory of 
    the hard drive. [Please make a backup of the file before editing]

[4] ... Modify the /S= portion of the command line choosing:
        /S=SD800.VGA     for 800x600
        /S=SD1024.VGA    for 1024x768

[5] ... Save the modified start-up batch file back to root directory
    using the same VP.BAT or VPPROF.BAT filename.

[6] ... Ventura will now boot in the selected mode.


                    ... Press a key to continue ...
